en	Site Configuration

en	Site

en	Site identifier

en	No pages found!

en	Please add at least one page through the Page module.

en	This site does not have a configuration, yet.

en	Add new site configuration for this site

en	Edit site configuration

en	Edit site settings

en	This site provides no configurable settings

en	Delete site configuration

en	Base URL

en	Unassigned site configurations

en	The following sites don't belong to any page anymore and can be removed.

en	Invalid site set configurations

en	The following site sets contain errors and therefore could not be loaded.

en	Set

en	Error

en	Duplicated Entrypoints

en	The following entry points are used more than once:

en	Duplicated root pages

en	The page with ID "%1s" is used in the following site configurations:

en	Edit site settings

en	Renamed identifier

en	Given site identifier "%1s" already exists. It has been renamed to "%2s". Maybe you want to edit the site again and give it a better name.

en	Identifier not changed

en	Given site identifier "%1s" already exists and points to a different site. The existing identifier "%2s" for this site is kept.

en	Site configuration not saved

en	Field "%1s" is a required field, but no value has been provided.

en	Duplicate error code removed

en	Two error handler configurations for error code "%1s" found. This would be an invalid configuration, the dangling one has been removed.

en	Duplicate language configuration removed

en	Two language configurations for language "%1s" found. This would be an invalid configuration, the dangling one has been removed.